:icons: image
:iconsdir: ../icons
:imagesdir: ../figures
:toc: macro
:title-logo-image: image:neorv32_logo_riscv.png[pdfwidth=6.25in,align=center]
// Uncomment next line to set page size (default is A4)
//:pdf-page-size: Letter